ARTICULO ORIGINAL Rev. Methodo 2023;8(3):145-147

https://doi.org/10.22529/me.2023.8(3)07

Recibido 16 Mar. 2023 | Aceptado 04 Abr. 2023 |Publicado 05 Jul. 2023

Concentración de inmunoglobulina G en neonatos de raza Bulldog Francés

Concentration of immunoglobulin G in French Bulldog neonates

Jordana Auad1

, Jaime Alejandro Deltrozzo1

, Luciana Agostina Fassola1, 2

, Daniel Christian Mori Alvarado3

, Alejandro Lozano1

1. Universidad Católica de Córdoba, Facultad de Ciencias Agropecuarias. Carrera de Veterinaria.

2. Centro de Investigación y Desarrollo en Inmunología y Enfermedades Infecciosas (CIDIE), Consejo Nacional de Investigaciones Científicas y Técnicas (CONICET)/Universidad Católica de Córdoba (UCC). Córdoba, Argentina 3. Clínica Veterinaria privada Animal Medical Center. Lima, Perú Correspondencia: Jordana Auad. email: jorauad@gmail.com

Resumen

En caninos, el tipo placentario es endoteliocorial, lo que limita el paso transplacentario de inmunoglobulinas. Los neonatos dependen de los anticuerpos presentes en el calostro. Este estudio tuvo como objetivos determinar la concentración de inmunoglobulina G (IgG) sérica en hembras durante el periparto, analizar la cinética de la IgG en el suero de las crías durante el primer mes de vida y comparar la concentración de IgG en la madre con la de la cría a las 48 horas posparto. Se examinaron 9 hembras de raza Bulldog Francés junto con sus crías. La concentración media de IgG en las hembras fue de 1622,22

mg/dl. En los cachorros, se encontraron niveles de IgG de 127,95 mg/dl al nacer, 843,1 mg/dl a las 48 horas y 283 mg/dl a los 30 días. Los valores de IgG en las hembras estaban dentro del rango normal para la especie canina. Sin embargo, las crías presentaron un nivel inicial de IgG más alto que disminuyó significativamente a los 30 días posparto, lo que se conoce como "bache inmunológico”.

Palabras claves: Inmunoglobulina G, bulldog francés, placenta endoteliocorial, inmunodifusión radial simple, suero.

Abstract

In canines, the placental type is endotheliochorial, which limits the transplacental passage of immunoglobulins. Neonates depend on the antibodies present in colostrum. This study aimed to determine the serum concentration of immunoglobulin G (IgG) in females during the peripartum period, analyze the kinetics of IgG in the serum of offspring during the first month of life, and compare the IgG concentration in the mother with that of the offspring at 48 hours postpartum. Nine French Bulldog females along with their offspring were examined. The mean concentration of IgG in females was 1622.22 mg/dL. In the puppies, IgG levels were found to be 127.95 mg/dL at birth, 843.1 mg/dL at 48 hours, and 283 mg/dL at 30 days. The IgG values in females were within the normal range for the canine species. However, the offspring exhibited an initial higher level of IgG that significantly decreased at 30 days postpartum, which is known as the "immunological gap".

Revista Methodo: Investigación Aplicada a las Ciencias Biológicas. Universidad Católica de Córdoba. Jacinto Ríos 571 Bº Gral. Paz. X5004FXS. Córdoba. Argentina. Tel.: (54) 351 4517299 / Correo: methodo@ucc.edu.ar 145

/ Web: methodo.ucc.edu.ar | ARTICULO ORIGINAL Rev. Methodo 2023;8(3):145-147.

Auad J, Deltrozzo J.A, Fassola L.A, Mori Alvarado C.D, Lozano A. Concentración de inmunoglobulina G en neonatos de raza Bulldog Francés

Keywords: Immunoglobulin G, French bulldog, endotheliochorial placenta, single radial immunodiffusion, serum.

Introducción

La estructura endoteliocorial de la placenta limita la

transferencia

transplacentaria

de

Inmunoglobulina G al torrente sanguíneo del recién nacido. Por lo tanto, un correcto calostrado es de vital importancia para la supervivencia del cachorro, ya que se encuentran expuestos a altas concentraciones de agentes infecciosos

inmediatamente

después

del

nacimiento1. En braquicéfalos se debe tener en cuenta algunos factores que podrían impactar en la concentración de IgG en suero del cachorro a las 48 hs de vida, como la cesárea y la anatomía facial2. En la raza Bulldog Francés no se reportan datos sobre la concentración de IgG. Los objetivos planteados en este estudio son los siguientes:

●

Determinar la concentración de IgG en

suero de hembras preñadas en el periparto.

Figura 3. Placa de inmunodifusión radial simple para

●

Establecer la cinética de la IgG en el cuantificación de IgG (mg/dl) en caninos.

suero de las crías durante el primer mes de vida.

●

Comparar la concentración de IgG en el suero de la madre con la concentración de la cría Resultados y discusión

a las 48hs pos parto.

Los valores promedio de la concentración de IgG

en suero se detallan en la (Tabla 1). Los niveles Materiales y métodos

de IgG de las madres en el periparto no difirieron con respecto a la media halladas en la Se estudiaron 9 madres y sus respectivas crías literatura6.La concentración de IgG en suero de (n=21) del centro de reproducción El Sitio neonatos a las 0hs fue un 76% mayor a las Canino, Córdoba, Argentina. Se tomó una descriptas en el modelo canino experimental, muestra de sangre a las madres en el periparto y donde la media fue de 30 mg/dl7. Se debe tener a las crías a las 0hs, 48hs y 30 días pos parto en cuenta que estas madres han sido expuestas a (Figura 1 y 2). La determinación de IgG se un correcto y periódico plan de inmunización. A realizó por inmunodifusión radial simple las 48hs de vida se observó un incremento del (IDRS), siendo la técnica de referencia3 (Figura 84% en comparación con los valores a las 0hs, 3). Para relacionar la concentración de IgG se esto concuerda con hallazgos de otros autores².

realizaron análisis de correlación utilizando los Si bien los valores a las 48 hs fueron máximos programas estadísticos InfoStat4 y R-Medic5. En siguen siendo más bajos que la de sus madres, todos los casos el nivel de significación fue de asemejándose en un 48%, coincidiendo con otras 0,05.

investigaciones7. Las concentraciones de IgG en suero de neonatos alcanzaron valores mínimos a los 30 días, lo que puede ser explicado por el catabolismo normal de las inmunoglobulinas maternas

y

es

definido

como

la

hipogammaglobulinemia fisiológica de los recién nacidos, coincidentemente con lo reportado en diferentes especies8 (Figura 4).

Conclusión

Figura 1 y 2. Extracción de sangre a las 0hs posparto Los valores de IgG en suero de madres de la raza en cachorros de raza Bulldog Francés.

Bulldog francés se encuentran en el rango descripto en el modelo experimental canino.

Revista Methodo: Investigación Aplicada a las Ciencias Biológicas. Universidad Católica de Córdoba.

Jacinto Ríos 571 Bº Gral. Paz. X5004FXS. Córdoba. Argentina. Tel.: (54) 351 4517299 / Correo: 146

methodo@ucc.edu.ar / Web: methodo.ucc.edu.ar| ARTICULO ORIGINAL Rev. Methodo 2023;8(3):145-147.

Auad J, Deltrozzo J.A, Fassola L.A, Mori Alvarado C.D, Lozano A . Concentración de inmunoglobulina G en neonatos de raza Bulldog Francés

Los cachorros Bulldog francés nacen con niveles de IgG superiores a la media hallada en caninos.

A las 48 hs posparto todos los cachorros alcanzan 2.

Packer RM, Hendricks A, Tivers MS, concentraciones por encima de lo que se Burn

CC.

Impact

of

Facial

denomina una falla en la transferencia pasiva de Conformation

on

Canine

Health:

IgG, por lo cual la cesárea y su anatomía facial Brachycephalic Obstructive Airway

no parece ser un problema para la correcta Syndrome. PloS one. 2015 oct;10(10): ingestión del calostro.

e0137496.

A los 30 días posparto los cachorros presentan 3.

Mancini G, Vaerman JP, Carbonara

una baja concentración de IgG, por lo que tienen AO, Heremans JF. A single radial

un mayor riesgo de padecer infecciones en esta method

for

the

immunogical

etapa.

quantitation

of

proteins.

Protides

Biological Fluids Proe. 1964; 11:370.

Tabla 1. Valores promedios y desvíos de IgG (mg/dl) en suero de madres y crías

4.

Di Rienzo J, Casanoves F, Balzarini M, González L, Tablada M, Robledo C.

Infostat-Software estadístico. FCA,

Universidad Nacional de Córdoba.

2013.

5.

Mangeaud A, Panigo DE. R-Medic. Un

programa

de

análisis

estadísticos

sencillo e intuitivo. Revista Methodo.

2018;3(1).

6.

Mila H, Feugier A, Grellet A, Anne J, Gonnier M, Martin M, Chastant-Maillard

S.

Immunoglobulin

G

concentration in canine colostrum:

Evaluation and variability. Journal of Figura 4. Concentración media (± DE) de IgG en Reproductive

Immunology.

2015;

suero de madres y evolución media (± DE) de la 112:24-28.

concentración en suero de crías desde las 0 horas hasta 7.

Chastant?Maillard S, Freyburger L,

los 30 días posparto.

*corresponde a diferencias con suero materno Marcheteau E, Thoumire S, Ravier JF,

(p<0,05).

Reynaud K. Timing of the intestinal barrier

closure

in

puppies.

Reproduction in domestic animals.

Bibliografía

2012; 47:190-193.

1.

Chastant S, Mila H. Passive immune 8.

Auad J, Cerutti J, Torres M, Fassola transfer

in

puppies.

Animal

LA, Lozano A. Transferencia de

Reproduction Science. 2019; 207:162-inmunoglobulina G materna a la cría en 170.

la

especie

porcina.

Analecta

Veterinaria. 2021;41(2):060.

Revista Methodo: Investigación Aplicada a las Ciencias Biológicas. Universidad Católica de Córdoba. Jacinto Ríos 571 Bº Gral. Paz. X5004FXS. Córdoba. Argentina. Tel.: (54) 351 4517299 / Correo: methodo@ucc.edu.ar 147

/ Web: methodo.ucc.edu.ar | ARTICULO ORIGINAL Rev. Methodo 2023;8(3):145-147.